-- 06-dic-2010 11:24:48 COT
-- BF3063575-Name size in I_Import does not match M_Prroduct
UPDATE AD_Column SET FieldLength=255,Updated=TO_DATE('2010-12-06 11:24:48','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Column_ID=3330
;

-- 06-dic-2010 11:25:01 COT
ALTER TABLE M_Product_Trl MODIFY Name NVARCHAR2(255)
;

-- 06-dic-2010 11:25:35 COT
UPDATE AD_Column SET FieldLength=255,Updated=TO_DATE('2010-12-06 11:25:35','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Column_ID=7819
;

-- 06-dic-2010 11:25:38 COT
ALTER TABLE I_Product MODIFY Name NVARCHAR2(255) DEFAULT NULL 
;

