-- Aug 18, 2009 7:33:11 PM COT
UPDATE AD_Field SET DisplayLength=20,Updated=TO_DATE('2009-08-18 19:33:11','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=55027
;

-- Aug 18, 2009 7:33:14 PM COT
UPDATE AD_Field SET DisplayLength=20,Updated=TO_DATE('2009-08-18 19:33:14','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=55028
;

