-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=10,IsDisplayedGrid='Y' WHERE AD_Field_ID=56666
;

-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=20,IsDisplayedGrid='Y' WHERE AD_Field_ID=201366
;

-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=30,IsDisplayedGrid='Y' WHERE AD_Field_ID=201367
;

-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=40,IsDisplayedGrid='Y' WHERE AD_Field_ID=201369
;

-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=50,IsDisplayedGrid='Y' WHERE AD_Field_ID=201368
;

-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=60,IsDisplayedGrid='Y' WHERE AD_Field_ID=56665
;

-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=70,IsDisplayedGrid='Y' WHERE AD_Field_ID=56664
;

-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=80,IsDisplayedGrid='Y' WHERE AD_Field_ID=201365
;

-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=90,IsDisplayedGrid='Y' WHERE AD_Field_ID=201895
;

-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=100,IsDisplayedGrid='Y' WHERE AD_Field_ID=56669
;

-- Jul 2, 2013 7:02:39 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=110,IsDisplayedGrid='Y' WHERE AD_Field_ID=56667
;

-- Jul 3, 2013 10:40:30 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56663
;

-- Jul 3, 2013 10:40:30 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56659
;

-- Jul 3, 2013 10:40:30 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56657
;

-- Jul 3, 2013 10:40:30 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=10,IsDisplayedGrid='Y' WHERE AD_Field_ID=56660
;

-- Jul 3, 2013 10:40:30 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=20,IsDisplayedGrid='Y' WHERE AD_Field_ID=56661
;

-- Jul 3, 2013 10:40:30 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=30,IsDisplayedGrid='Y' WHERE AD_Field_ID=56658
;

-- Jul 3, 2013 10:40:30 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=40,IsDisplayedGrid='Y' WHERE AD_Field_ID=56662
;

-- Jul 3, 2013 10:40:30 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=50,IsDisplayedGrid='Y' WHERE AD_Field_ID=56656
;

-- Jul 3, 2013 10:50:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56669
;

-- Jul 3, 2013 10:50:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56665
;

-- Jul 3, 2013 10:50:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56667
;

-- Jul 3, 2013 10:50:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=60,IsDisplayedGrid='Y' WHERE AD_Field_ID=201895
;

-- Jul 3, 2013 10:50:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=70,IsDisplayedGrid='Y' WHERE AD_Field_ID=201365
;

-- Jul 3, 2013 10:50:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=80,IsDisplayedGrid='Y' WHERE AD_Field_ID=56664
;

-- Jul 3, 2013 10:57:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56675
;

-- Jul 3, 2013 10:57:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56673
;

-- Jul 3, 2013 10:57:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56671
;

-- Jul 3, 2013 10:57:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=10,IsDisplayedGrid='Y' WHERE AD_Field_ID=56672
;

-- Jul 3, 2013 10:57:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=20,IsDisplayedGrid='Y' WHERE AD_Field_ID=56674
;

-- Jul 3, 2013 10:57:40 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=30,IsDisplayedGrid='Y' WHERE AD_Field_ID=56670
;

-- Jul 3, 2013 10:58:28 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56681
;

-- Jul 3, 2013 10:58:28 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56677
;

-- Jul 3, 2013 10:58:28 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=56678
;

-- Jul 3, 2013 10:58:28 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=10,IsDisplayedGrid='Y' WHERE AD_Field_ID=56680
;

-- Jul 3, 2013 10:58:28 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=20,IsDisplayedGrid='Y' WHERE AD_Field_ID=56679
;

-- Jul 3, 2013 10:58:28 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET SeqNoGrid=30,IsDisplayedGrid='Y' WHERE AD_Field_ID=56676
;

-- Jul 10, 2013 11:33:41 AM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Field SET DisplayLogic='@WS_WebService_ID@ !200001',Updated=TO_TIMESTAMP('2013-07-10 11:33:41','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=56652
;

SELECT register_migration_script('201307031130_IDEMPIERE-1164.sql') FROM dual
;
