-- Nov 17, 2010 10:04:25 PM CST
-- BF3110938-Mandatory Incorrectly Spelled
UPDATE AD_Ref_List SET Name='Not Mandatory',Updated=TO_DATE('2010-11-17 22:04:25','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Ref_List_ID=681
;

