-- Feb 26, 2008 9:21:21 PM COT
-- 1902656 - Hard to find process in Role window
UPDATE AD_Column SET IsIdentifier='Y',SeqNo=2,Updated=TO_DATE('2008-02-26 21:21:28','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Column_ID=2809
;