-- 29.08.2008 16:50:06 EEST
-- Fix BOM Window, Line order
UPDATE AD_Field SET SortNo=1.000000000000,Updated=TO_DATE('2008-08-29 16:50:06','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=0 WHERE AD_Field_ID=53485
;
