-- 17-ene-2008 0:07:20 COT
-- [ 1873440 ] Product window misconfigured
UPDATE AD_Field SET IsSameLine='N', SeqNo=530,Updated=TO_DATE('2008-01-17 00:07:20','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=52016
;

UPDATE AD_Field SET SeqNo=520,Updated=TO_DATE('2008-01-17 00:07:26','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=52015
;

