-- Jul 31, 2013 3:43:04 PM IST
-- Changes in the layout of Web Service Security window
UPDATE AD_Column SET FieldLength=40,Updated=TO_TIMESTAMP('2013-07-31 15:43:04','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Column_ID=61999
;

