-- Oct 31, 2013 6:34:52 PM COT
-- UUIDs for Release 2.0
UPDATE AD_Menu SET AD_Menu_UU='0f81631a-9172-45d8-8351-dcb56f15a2fe' WHERE AD_Menu_ID=53287
;

-- Oct 31, 2013 6:35:13 PM COT
UPDATE AD_TreeNodeMM SET AD_TreeNodeMM_UU='d341bb0c-3641-43c6-a2a1-8e2088890fb6',Updated=TO_TIMESTAMP('2013-10-31 18:35:13','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Tree_ID=10 AND Node_ID=53362
;

-- Oct 31, 2013 6:35:13 PM COT
UPDATE AD_TreeNodeMM SET AD_TreeNodeMM_UU='30314a5b-829b-4064-9725-787ec0c7fb44',Updated=TO_TIMESTAMP('2013-10-31 18:35:13','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Tree_ID=10 AND Node_ID=53386
;

-- Oct 31, 2013 6:35:13 PM COT
UPDATE AD_TreeNodeMM SET AD_TreeNodeMM_UU='3e0452a5-1ce0-430a-9858-2bb58eb4426c',Updated=TO_TIMESTAMP('2013-10-31 18:35:13','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Tree_ID=10 AND Node_ID=53360
;

-- Oct 31, 2013 6:35:13 PM COT
UPDATE AD_TreeNodeMM SET AD_TreeNodeMM_UU='7d9e33c6-4b19-4559-af82-8b9ff093f704',Updated=TO_TIMESTAMP('2013-10-31 18:35:13','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Tree_ID=10 AND Node_ID=53359
;

-- Oct 31, 2013 6:35:13 PM COT
UPDATE AD_TreeNodeMM SET AD_TreeNodeMM_UU='52febb3b-0d64-497a-b257-c791ab04570e',Updated=TO_TIMESTAMP('2013-10-31 18:35:13','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Tree_ID=10 AND Node_ID=53358
;

-- Oct 31, 2013 6:35:13 PM COT
UPDATE AD_TreeNodeMM SET AD_TreeNodeMM_UU='678a0905-89b0-4c81-a9e8-abe15cf27f8a',Updated=TO_TIMESTAMP('2013-10-31 18:35:13','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Tree_ID=10 AND Node_ID=53361
;

-- Oct 31, 2013 6:35:13 PM COT
UPDATE AD_TreeNodeMM SET AD_TreeNodeMM_UU='31df78e6-8fc4-4788-bfc3-64a362f213ee',Updated=TO_TIMESTAMP('2013-10-31 18:35:13','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Tree_ID=10 AND Node_ID=53363
;

-- Oct 31, 2013 6:35:13 PM COT
UPDATE AD_TreeNodeMM SET AD_TreeNodeMM_UU='6c891bd8-f114-426a-a45c-af9e31518c42',Updated=TO_TIMESTAMP('2013-10-31 18:35:13','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Tree_ID=10 AND Node_ID=53287
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='9eb9ca2f-f8f0-49bf-afa8-6cb91c67043c' WHERE AD_Column_ID=59675
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='beee8b15-91b4-4803-9922-3d7a0ebbb244' WHERE AD_Column_ID=59684
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='057c5904-fea8-4e7e-8366-017cfe1fc686' WHERE AD_Column_ID=59685
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='34ddace4-d7b1-4872-8a31-60018ffcb279' WHERE AD_Column_ID=59667
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='d5d7edd9-0ebf-40b8-b17e-3f82b4b43e93' WHERE AD_Column_ID=59668
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='2cb0efbf-7496-4b68-8d49-5765a4d4e57a' WHERE AD_Column_ID=59671
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='977bc09c-249e-423c-8ce4-980829d14708' WHERE AD_Column_ID=59672
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='635b3a60-d3c7-4c22-b4c1-58b1610b8230' WHERE AD_Column_ID=59674
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='9756b9aa-8d81-4e94-b536-3a7221c703ea' WHERE AD_Column_ID=59676
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='e47afc11-1c8b-431e-9ad6-8f4c37ce731e' WHERE AD_Column_ID=59678
;

-- Oct 31, 2013 6:35:26 PM COT
UPDATE AD_Column SET AD_Column_UU='e914a8da-2a52-42f2-ac46-6a452728c493' WHERE AD_Column_ID=59683
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='54c31f1a-2d54-4684-ac2d-7ccbf0822fa7' WHERE AD_Column_ID=59680
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='9f926bc1-8ef0-4d68-a4d1-ed1114e6297b' WHERE AD_Column_ID=59682
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='9c2f6a20-34b7-41ea-8b94-ee888615f77d' WHERE AD_Column_ID=59673
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='892049b8-34fd-420e-8968-d21a5fca9bbd' WHERE AD_Column_ID=59687
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='f0283606-18e6-46b7-a07f-bdfcaf041614' WHERE AD_Column_ID=59669
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='c122fee9-28b0-41bd-8ed6-70b1ec896a7d' WHERE AD_Column_ID=59677
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='1003bb86-2354-41d3-8c42-7031e10670a8' WHERE AD_Column_ID=59688
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='85188012-c7b8-48cb-a103-b9f072cff813' WHERE AD_Column_ID=59689
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='cd8c7b43-ecf7-460e-b755-47ea0a9ee977' WHERE AD_Column_ID=59690
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='bff7e6ea-f396-4686-8fda-98c25554fa31' WHERE AD_Column_ID=59691
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='c3e07dbc-cde9-4cd4-a659-aeeecd29ac2c' WHERE AD_Column_ID=59692
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='034183b7-adfa-4d44-a9fa-5f6990026918' WHERE AD_Column_ID=59693
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='cb446868-ff75-4961-bbe8-1df596a6ab0a' WHERE AD_Column_ID=59694
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='44d05c29-7f98-4b9d-8fea-b9393f511d13' WHERE AD_Column_ID=59697
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='b6683ef8-a582-453a-a924-e29ebd0e695d' WHERE AD_Column_ID=59698
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='b3bfa6de-5531-40e9-ab8d-6404adb4497a' WHERE AD_Column_ID=59699
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='58a4bed3-2d59-4eb1-a3f9-155f9c52a7e0' WHERE AD_Column_ID=59700
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='d3ba7748-b80a-4103-8b9e-076bd780e330' WHERE AD_Column_ID=59702
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='e4d10e3a-6ce2-4604-afc9-87ec8bdd6def' WHERE AD_Column_ID=59696
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='3495e70d-7fc0-4bf2-aab6-5556ef1be65d' WHERE AD_Column_ID=59900
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='c431c3ac-5fc2-4f57-8338-e2047704e5c8' WHERE AD_Column_ID=59901
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='c6c8fbf6-5cdd-4b58-8560-008347ca97b5' WHERE AD_Column_ID=59902
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='2f0e25c5-34ca-4ec0-bd51-a43707f3ad9b' WHERE AD_Column_ID=59903
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='22c3f32d-ef57-4ce4-9ab0-b5bf773bcf97' WHERE AD_Column_ID=59906
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='a850c9ee-f08f-4c13-96a6-7ed247735036' WHERE AD_Column_ID=59907
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='3cb1ba42-f5fe-47b8-b254-90cfe159ff85' WHERE AD_Column_ID=59905
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='18172092-dad5-4dbe-ad5b-4f8b71914bf7' WHERE AD_Column_ID=59904
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='bfdb2a40-b37b-4508-bae0-991bf8460022' WHERE AD_Column_ID=59695
;

-- Oct 31, 2013 6:35:27 PM COT
UPDATE AD_Column SET AD_Column_UU='2fee1307-77c5-41a1-9755-59386f701bbb' WHERE AD_Column_ID=59701
;

-- Oct 31, 2013 6:35:37 PM COT
UPDATE AD_Window SET AD_Window_UU='e655498a-24a1-45ae-b7c3-7819e914d600' WHERE AD_Window_ID=53124
;

-- Oct 31, 2013 6:35:45 PM COT
UPDATE AD_Element SET AD_Element_UU='3eb0b517-379f-4714-8913-e0c0718f17f7' WHERE AD_Element_ID=54322
;

-- Oct 31, 2013 6:35:45 PM COT
UPDATE AD_Element SET AD_Element_UU='8c3b76b0-85b7-481c-9a41-ba048e728ea0' WHERE AD_Element_ID=54321
;

-- Oct 31, 2013 6:35:45 PM COT
UPDATE AD_Element SET AD_Element_UU='69212eab-3fe9-4065-8721-2a9208a4b559' WHERE AD_Element_ID=54320
;

-- Oct 31, 2013 6:35:45 PM COT
UPDATE AD_Element SET AD_Element_UU='5fbe833c-6041-4e16-b3f7-9ba3669f0ead' WHERE AD_Element_ID=54319
;

-- Oct 31, 2013 6:35:45 PM COT
UPDATE AD_Element SET AD_Element_UU='d10cee06-cfb1-4357-98d9-fa7e0a620572' WHERE AD_Element_ID=54318
;

-- Oct 31, 2013 6:35:46 PM COT
UPDATE AD_Element SET AD_Element_UU='698964d9-d6bf-4d03-9d6a-75b3b1b0e342' WHERE AD_Element_ID=54317
;

-- Oct 31, 2013 6:35:46 PM COT
UPDATE AD_Element SET AD_Element_UU='b600e67c-9ee9-495b-a764-3775694d1f60' WHERE AD_Element_ID=54316
;

-- Oct 31, 2013 6:35:46 PM COT
UPDATE AD_Element SET AD_Element_UU='e40d72be-b868-4eef-85b0-b64606b3f6cf' WHERE AD_Element_ID=54315
;

-- Oct 31, 2013 6:35:46 PM COT
UPDATE AD_Element SET AD_Element_UU='77f83372-1b27-426a-81a6-a1a0bdde288e' WHERE AD_Element_ID=54271
;

-- Oct 31, 2013 6:35:46 PM COT
UPDATE AD_Element SET AD_Element_UU='945220b0-484b-4ac9-9c0f-58329f95d862' WHERE AD_Element_ID=54270
;

-- Oct 31, 2013 6:35:46 PM COT
UPDATE AD_Element SET AD_Element_UU='95f69ea8-7ee7-4cfc-90f2-ef557bdaf0bb' WHERE AD_Element_ID=54269
;

-- Oct 31, 2013 6:35:46 PM COT
UPDATE AD_Element SET AD_Element_UU='c4d41401-3e19-4a5a-aba6-58d145de3b0f' WHERE AD_Element_ID=54268
;

-- Oct 31, 2013 6:35:52 PM COT
UPDATE AD_Field SET AD_Field_UU='d98127db-f546-4901-9bb9-ab7672d2742c' WHERE AD_Field_ID=59604
;

-- Oct 31, 2013 6:35:52 PM COT
UPDATE AD_Field SET AD_Field_UU='dfc5be59-e950-4365-b7b1-ee9f3184795d' WHERE AD_Field_ID=59617
;

-- Oct 31, 2013 6:35:52 PM COT
UPDATE AD_Field SET AD_Field_UU='d4da11a2-0341-4381-a07a-d80860043b87' WHERE AD_Field_ID=59596
;

-- Oct 31, 2013 6:35:52 PM COT
UPDATE AD_Field SET AD_Field_UU='3748d5f1-061d-4966-8dc9-7147c6ff62ae' WHERE AD_Field_ID=59676
;

-- Oct 31, 2013 6:35:52 PM COT
UPDATE AD_Field SET AD_Field_UU='8eb4d1dc-0c50-43d2-988b-fb4020a52ac5' WHERE AD_Field_ID=59599
;

-- Oct 31, 2013 6:35:52 PM COT
UPDATE AD_Field SET AD_Field_UU='59bf677d-5452-4446-b4e5-6eca28021033' WHERE AD_Field_ID=59597
;

-- Oct 31, 2013 6:35:52 PM COT
UPDATE AD_Field SET AD_Field_UU='6fb065a9-444b-4ee3-b11b-f2f5ebefaa53' WHERE AD_Field_ID=59603
;

-- Oct 31, 2013 6:35:52 PM COT
UPDATE AD_Field SET AD_Field_UU='6b4c7b27-29ce-4dec-8ece-824d09af5772' WHERE AD_Field_ID=59601
;

-- Oct 31, 2013 6:35:52 PM COT
UPDATE AD_Field SET AD_Field_UU='769174f7-83df-47fe-a695-1d41ea60ef05' WHERE AD_Field_ID=59600
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='4b0d9d93-7e0e-43ce-8488-80d5eba3cc61' WHERE AD_Field_ID=59605
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='66af44aa-1b04-4ce1-95dc-a7df72205757' WHERE AD_Field_ID=59607
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='f4d88d59-cc37-4cd1-8773-ec7eeddd94e9' WHERE AD_Field_ID=59606
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='d5a16956-25f8-410a-81c6-ab25a585a3f1' WHERE AD_Field_ID=59610
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='6e1194c1-89cf-4547-b899-d1b4f9c2eaf9' WHERE AD_Field_ID=59611
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='6828337f-fa06-4dbb-8d25-45cd0bd4f816' WHERE AD_Field_ID=59598
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='6519351c-7077-4d6b-a39e-20a2b21b9cae' WHERE AD_Field_ID=59602
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='8a1bf676-84ba-49b7-b7e2-cdc642b1c727' WHERE AD_Field_ID=59609
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='e15bd349-baef-46dc-9799-7d3cdc8d7927' WHERE AD_Field_ID=59608
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='82e890ae-3774-4470-8df4-39a0f710e389' WHERE AD_Field_ID=59613
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='61da21de-2501-4dc8-b348-50924b09199f' WHERE AD_Field_ID=59612
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='a9a15d07-9402-405f-9037-6418746c0fc3' WHERE AD_Field_ID=59614
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='7e9cfbc6-fe19-4d42-b592-efdf53ce9498' WHERE AD_Field_ID=59618
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='e1d7da2b-bf7c-4f9c-b01a-0dc426f22e70' WHERE AD_Field_ID=59619
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='1591f364-8b42-414f-b8b6-76c75a15b5d1' WHERE AD_Field_ID=59674
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='5e8bcc20-6519-4ee0-96a3-ad4592fa1638' WHERE AD_Field_ID=59675
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='a65ea368-fa53-4d57-a156-d063b5c0a9c2' WHERE AD_Field_ID=59677
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='13fe8ca2-6597-4fef-8ea0-7d9d9e2a259e' WHERE AD_Field_ID=59615
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='964e1c2b-2659-445f-8220-2c7144e40c9b' WHERE AD_Field_ID=59673
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='9980d9f3-2337-4270-a1b2-046f2e62bcad' WHERE AD_Field_ID=59616
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='945ef2aa-8e6a-4211-af09-de23cf4969d8' WHERE AD_Field_ID=59679
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='742c6877-2e7f-4b11-8a39-cfc611a3a590' WHERE AD_Field_ID=59680
;

-- Oct 31, 2013 6:35:53 PM COT
UPDATE AD_Field SET AD_Field_UU='130f8729-0f6b-44c5-a694-43572b16e2db' WHERE AD_Field_ID=59678
;

-- Oct 31, 2013 6:36:01 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='2afdaa43-fd01-441c-9ff6-2a9fbcd88ff8' WHERE AD_Ref_List_ID=53648
;

-- Oct 31, 2013 6:36:01 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='2070043c-07b7-4f82-8f06-9c7d19ff0d20' WHERE AD_Ref_List_ID=53647
;

-- Oct 31, 2013 6:36:01 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='622a1d59-28ed-484c-a6e4-1e01443c2a81' WHERE AD_Ref_List_ID=53646
;

-- Oct 31, 2013 6:36:01 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='4ae68689-3f5f-4ba4-b0c8-ec9c3c610986' WHERE AD_Ref_List_ID=53645
;

-- Oct 31, 2013 6:36:01 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='d9cae711-0fdd-4de5-b77e-b9a74ea818f1' WHERE AD_Ref_List_ID=53644
;

-- Oct 31, 2013 6:36:01 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='65f73a60-e27d-4f9b-a6f1-6d32ee8b7bd3' WHERE AD_Ref_List_ID=53643
;

-- Oct 31, 2013 6:36:01 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='272e8091-1706-49c2-af6a-d45b6f23d1ef' WHERE AD_Ref_List_ID=53642
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='22572bc7-d1f9-45b0-9adf-5bab4beae5b3' WHERE AD_Ref_List_ID=53641
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='320eebfe-6011-42ce-9698-70bdb8f239fe' WHERE AD_Ref_List_ID=53640
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='bfeb4548-7b52-4847-9b56-7529cba194f4' WHERE AD_Ref_List_ID=53638
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='53310de6-2cfd-4cee-bd1a-298e77c5ed9a' WHERE AD_Ref_List_ID=53639
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='4d29bcff-81fc-4a8a-8844-2708847eeed2' WHERE AD_Ref_List_ID=53637
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='d3384136-4384-42a6-9e14-473d05c608bc' WHERE AD_Ref_List_ID=53636
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='93cc1101-b9be-4cc2-a500-09f1c15780b7' WHERE AD_Ref_List_ID=53635
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='8861af0f-d610-4aa7-9644-b61a47f67b53' WHERE AD_Ref_List_ID=53634
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='21157769-4f20-454a-b333-6336e1af19e8' WHERE AD_Ref_List_ID=53633
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='e1da3032-8970-4e61-8c6c-1732ff2cdf0f' WHERE AD_Ref_List_ID=53632
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='f158efbb-ddb9-4dd4-b630-adefad4ab103' WHERE AD_Ref_List_ID=53631
;

-- Oct 31, 2013 6:36:02 PM COT
UPDATE AD_Ref_List SET AD_Ref_List_UU='e4c14bf1-2522-4d47-9469-ea261017054f' WHERE AD_Ref_List_ID=53630
;

-- Oct 31, 2013 6:36:09 PM COT
UPDATE AD_Sequence SET AD_Sequence_UU='6c0e7cfd-09d7-4e0e-8c73-2723c3450794' WHERE AD_Sequence_ID=53397
;

-- Oct 31, 2013 6:36:16 PM COT
UPDATE AD_Tab SET AD_Tab_UU='061d2441-a3ff-4c96-8458-2432d60bd2da' WHERE AD_Tab_ID=53339
;

-- Oct 31, 2013 6:36:16 PM COT
UPDATE AD_Tab SET AD_Tab_UU='9ce33a08-0a24-443e-a775-37d6c8845a95' WHERE AD_Tab_ID=53340
;

-- Oct 31, 2013 6:36:24 PM COT
UPDATE AD_Reference SET AD_Reference_UU='33852dad-acf3-4b71-a5bc-a69da40ecaea' WHERE AD_Reference_ID=53377
;

-- Oct 31, 2013 6:36:24 PM COT
UPDATE AD_Reference SET AD_Reference_UU='012b34b7-f76e-451b-aabd-864ec16222cd' WHERE AD_Reference_ID=53376
;

-- Oct 31, 2013 6:36:24 PM COT
UPDATE AD_Reference SET AD_Reference_UU='9d24bc19-f7a2-4769-9a71-acdbde5fd599' WHERE AD_Reference_ID=53375
;

-- Oct 31, 2013 6:36:24 PM COT
UPDATE AD_Reference SET AD_Reference_UU='f8ee9942-65f1-4d3a-b284-fccd9fbbd1ae' WHERE AD_Reference_ID=53370
;

-- Oct 31, 2013 6:36:31 PM COT
UPDATE AD_Table SET AD_Table_UU='2736d02e-9d80-4181-9be2-75707265e449' WHERE AD_Table_ID=53284
;

-- Oct 31, 2013 6:36:31 PM COT
UPDATE AD_Table SET AD_Table_UU='7a3a5b14-cc32-4c60-b650-3253ec1d16d8' WHERE AD_Table_ID=53282
;

SELECT register_migration_script('201310311837_UUIDsRelease2.sql') FROM dual
;

