-- Mar 19, 2008 7:17:07 PM COT
-- 1920314 - Make configurable the changelog for insert
INSERT INTO AD_SysConfig (AD_Client_ID,AD_Org_ID,AD_SysConfig_ID,ConfigurationLevel,Created,CreatedBy,Description,EntityType,IsActive,Name,Updated,UpdatedBy,Value) VALUES (0,0,50015,'C',TO_TIMESTAMP('2008-03-19 19:17:05','YYYY-MM-DD HH24:MI:SS'),100,'Keep change log for inserts: Y - Yes, N - No, K - just the key _ID','D','Y','SYSTEM_INSERT_CHANGELOG',TO_TIMESTAMP('2008-03-19 19:17:05','YYYY-MM-DD HH24:MI:SS'),100,'Y')
;

