-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET ColumnSpan=5, SeqNo=40, IsDisplayed='Y', XPosition=1,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59745
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=60,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59740
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=70,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59744
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=80,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59752
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=90,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59743
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=100,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59754
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=110,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=62015
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=120,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=62016
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=130, IsDisplayed='Y', XPosition=5,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59736
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=160, IsDisplayed='Y', XPosition=1,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=62017
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=170, IsDisplayed='Y', XPosition=4,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=62018
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=180, IsDisplayed='Y', XPosition=1,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59755
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=190, IsDisplayed='Y', XPosition=4,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59737
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=200,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59748
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=210,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59738
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=220,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59757
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=230,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59758
;

-- Dec 3, 2012 3:36:32 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=240,Updated=TO_DATE('2012-12-03 15:36:32','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59759
;

-- Dec 3, 2012 3:38:37 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=20, IsDisplayed='Y', XPosition=4,Updated=TO_DATE('2012-12-03 15:38:37','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=61974
;

-- Dec 3, 2012 3:38:37 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=30,Updated=TO_DATE('2012-12-03 15:38:37','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=61976
;

-- Dec 3, 2012 3:38:37 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=40,Updated=TO_DATE('2012-12-03 15:38:37','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=61977
;

-- Dec 3, 2012 3:38:37 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=50, IsDisplayed='Y', XPosition=5,Updated=TO_DATE('2012-12-03 15:38:37','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=61975
;

-- Dec 3, 2012 3:38:37 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNo=100, IsDisplayed='Y', XPosition=5,Updated=TO_DATE('2012-12-03 15:38:37','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=61983
;

-- Dec 3, 2012 3:44:23 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNoGrid=0,IsDisplayedGrid='N' WHERE AD_Field_ID=61973
;

-- Dec 3, 2012 3:44:23 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNoGrid=10,IsDisplayedGrid='Y' WHERE AD_Field_ID=61974
;

-- Dec 3, 2012 3:44:23 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNoGrid=20,IsDisplayedGrid='Y' WHERE AD_Field_ID=61976
;

-- Dec 3, 2012 3:44:23 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNoGrid=30,IsDisplayedGrid='Y' WHERE AD_Field_ID=61977
;

-- Dec 3, 2012 3:44:23 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNoGrid=40,IsDisplayedGrid='Y' WHERE AD_Field_ID=61975
;

-- Dec 3, 2012 3:44:23 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNoGrid=50,IsDisplayedGrid='Y' WHERE AD_Field_ID=61978
;

-- Dec 3, 2012 3:44:23 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNoGrid=60,IsDisplayedGrid='Y' WHERE AD_Field_ID=61979
;

-- Dec 3, 2012 3:44:23 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNoGrid=70,IsDisplayedGrid='Y' WHERE AD_Field_ID=61980
;

-- Dec 3, 2012 3:44:23 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNoGrid=80,IsDisplayedGrid='Y' WHERE AD_Field_ID=61981
;

-- Dec 3, 2012 3:44:23 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET SeqNoGrid=90,IsDisplayedGrid='Y' WHERE AD_Field_ID=61983
;

-- Dec 3, 2012 3:47:27 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET DefaultValue='@$Element_PJ@=''Y''',Updated=TO_DATE('2012-12-03 15:47:27','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59755
;

-- Dec 3, 2012 3:47:33 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET DefaultValue='@$Element_AY@=''Y''',Updated=TO_DATE('2012-12-03 15:47:33','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59737
;

-- Dec 3, 2012 3:47:58 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET DisplayLogic='@$Element_MC@=Y',Updated=TO_DATE('2012-12-03 15:47:58','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59738
;

-- Dec 3, 2012 3:48:03 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET DisplayLogic='@$Element_AY@=''Y''', DefaultValue=NULL,Updated=TO_DATE('2012-12-03 15:48:03','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59737
;

-- Dec 3, 2012 3:48:06 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET DisplayLogic='@$Element_PJ@=''Y''', DefaultValue=NULL,Updated=TO_DATE('2012-12-03 15:48:06','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59755
;

-- Dec 3, 2012 3:48:25 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET DisplayLogic='@$Element_OT@=Y',Updated=TO_DATE('2012-12-03 15:48:25','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59757
;

-- Dec 3, 2012 3:48:33 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET DisplayLogic='@$Element_U1@=Y',Updated=TO_DATE('2012-12-03 15:48:33','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59758
;

-- Dec 3, 2012 3:48:42 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Field SET DisplayLogic='@$Element_U1@=Y',Updated=TO_DATE('2012-12-03 15:48:42','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Field_ID=59759
;

-- Dec 3, 2012 4:02:02 PM COT
-- IDEMPIERE-246 Integrate Manufacturing Light
UPDATE AD_Table SET AD_Window_ID=53149,Updated=TO_DATE('2012-12-03 16:02:02','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=100 WHERE AD_Table_ID=53332
;

SELECT register_migration_script('201212031552_IDEMPIERE-246.sql') FROM dual
;

