-- 12.12.2008 15:10:33 EET
UPDATE AD_Column SET DefaultValue='Z',Updated=TO_DATE('2008-12-12 15:10:33','YYYY-MM-DD HH24:MI:SS'),UpdatedBy=0 WHERE AD_Column_ID=53457
;

